Octopus

Fig. 3

Fig. B1

1 2 3

9 10 11

4 5 6 7

8

NRN V1.21 TUE 16-JUL-96 13:17:29 CST 1

Time (msec)

Membrane Voltage (mV)

CWM MDT Figs 3, B1