current

A Vm

B h

m h

m

NRN V1.23 WED 11-SEP-96 11:31:54 CST 1

Membrane Voltage (mV)

CWM Onset Fig 9 J-0007-7

Time (msec)

octp4e1a.prm: Iinj 3.3 nA, 10-50 ms; DC Leakage: 3.217e-08 S -70.13 mV gIH: gmax 0.02