current axon

soma A Vm

B h

m h

m

C gKLT

NRN V1.23 THU 05-SEP-96 13:16:28 CST 1

Membrane Voltage (mV)

Conductance (nS)

CWM Onset Fig 4 J-0007-7

Time (msec)

octp4e1a.prm: Iinj 1.8 nA, 10-50 ms; DC Leakage: 3.217e-08 S -58.38 mV gNa: gmax 0.01, Msh 1.8, Hsh -10, Mfac 0.1315, Hfac 0.1315 gK: gmax 0.01, Nsh -1.3, Nfac 0.25 gKLT: gmax 0.01, Bsf 10, Bfac 0.75, a0, b0, 0.03 0.042, Ka, Kb, 14.5 31.25 gIH: gmax 0.01, IHsf 0, Ks 5