A^{Octopus}

axon (d=3μm, l=70μm) soma (d=32μm)

dendrites (d=5μm, l=200μm) B (axon)

(soma)

(dendrites)

1 2 20 C Cm g_{leak}

E_{leak} gi

Ei

CWM Onset Fig 1 J-0007-7